MIMIC Commands

Mark Jeffries

December 17, 1996

Contents

General 1

Using from ICL 1 Getting help : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 1 Going to next screen : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 2 Going to next screen : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 2 Going to next screen : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 2 Going to a specified page : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 2 Updating the screen : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 2

Selecting or Re-starting the Mimic 2 Re-starting the MIMIC : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 2

Using a seperate process 2 Entering the mimic interface : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 2

General

The mimic interface can be used either straight from ICL or it can be spawned as a seperate subprocess if multiple commands are required.

At times ICL can tie up the mimic interface if this happens, indicated by ICL saying that the process requires further data “¡CR¿ to abort” try typing NO then pressing return twice if pressing return alone does not work.

Using from ICL

Commands can be entered one at a time using the MIMIC command.

Getting help

Format: MIMIC HELP Description: Enters the mimic help system, this is used the same as help in DCL and gives information on using the mimic interface.

Going to next screen

Format: MIMIC PAGES Description: Lists the names of all the available mimic pages. This is the same list as that given on the mimic display.

Going to next screen

Format: MIMIC NEXT Description: Switches the visible mimic page for the next one in the list.

Going to next screen

Format: MIMIC PREVIOUS Description: Switches the visible mimic page for the previous one in the list.

Going to a specified page

Format: SCREEN screen name Description: Switches the visible mimic page for the one given. screen name: The screen name, one of the names given by the PAGES command.

Updating the screen

Format: MIMIC UPDATE Description: Used to refresh the screen if it appears to have become out of date.

Selecting or Re-starting the Mimic

The MIMIC may be run on either the Vaxstation or the IKON. The command below allows the user to re-start the MIMIC on either display device. If a MIMIC is already running it will be stopped first.

Re-starting the MIMIC

Format: MIMIC START Description: Used to restart the MIMIC. You are prompted for the display type : either VAXSTA- TION or IKON.

Using a seperate process

By using a seperate process for the mimic interface multiple commands can be used and interaction problems with ICL can be avoided. All the commands given above can be used, but in this case the MIMIC keyword before them is left out. Furthermore the keypad can be used to enter the commands. Further information on the mimic interface can be found by entering HELP inside it.

Entering the mimic interface

Format: SPAWN MIM INTER Description: Used to enter the mimic interface.