%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%      This index was created and supplied by Chris Benn (crb)
%      for the INT_USER manual Version 1.0 (Jan 1991)
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\documentstyle{article}
\setlength{\topmargin}{-15mm}
\setlength{\textheight}{250mm}
\setlength{\textwidth}{140mm}
\setlength{\oddsidemargin}{0mm}
\setlength{\evensidemargin}{0mm}
\setlength{\unitlength}{1mm}
\setlength{\parindent}{0mm}
\setlength{\parskip}{\medskipamount}
%\pagestyle{empty}
\begin{document}

\begin{center}
\LARGE\bf
Index to INT User Manual
\end{center}


For each topic is given in the second column the number of the 
Section in the INT User Manual (LP Users' Manual 20)
where further information may be found.
See under `Commands' for a list of individual commands.

CRB 1991 May 15

\vspace{3mm}
\begin{tabular}{ll}
A aperture & 4.11 \\
Accounts on ICS & 9.2 \\
ACQUIRE & 4.12, 8.4 \\
Acquiring a guide star & 4.10 \\
Acquisition & 2.5.1, 3.0, 4.6, 12.0 \\
Acquisition TV & 10.0 \\
Acquisition TV field at Cass. & 12.2.1 \\
ADAM terminal & 9.1 \\
Air mass & 8.7 \\
Air-conditioning alarm & 2.4.4 \\
Alarms & 2.4.4 \\
Altitude & 2.1 \\
AOXNOM, AOYNOM & 11.4 \\
APERTURE & 8.4 \\
Aperture offsets & 4.11 \\
Archiving TV images & 4.15 \\
Autoguider filters & 3.1, 3.2 \\
Autoguider focus & 11.5.1, 11.5.2 \\
Autoguider focus at Prime & 4.9.7 \\
Autoguider gain & 11.5.3 \\
Autoguider problems & 13.4 \\
Autoguider tests & 11.5 \\
Autoguiding & 12.0 \\
AUTOPNT & 11.1.7 \\
Axes intersection & 2.1 \\
Azimuth of telescope and dome & 8.7 \\
A\&G box geometry & 11.4 \\
B aperture & 4.11 \\
Back focal distance & 15.0 \\
Bad data & 9.5.2 \\
Baldwin encoders & 2.2 \\
Baldwin encoders - see also encoders & \\
Banjo & 2.2 \\
Beamswitching & 4.11 \\
Bearings & 2.2 \\
Beckmann display & 2.4.1, 8.7 \\
Blind offsets at Cassegrain & 4.12 \\
Blinds & 5.2 \\
C-tapes & 6.3 \\
\end{tabular}

\begin{tabular}{ll}
Calibration procedures for INT & 11.0 \\
CAMAC & 2.2, 7.3.3 \\
Cassegrain A\&G geometry  & 11.4.1, 12.2.2 \\
Catalogue format & 3.4.1 \\
Catalogues - examples & 8.5 \\
Catalogues  & 2.4, 8.1.3 \\
CLIP centre & 2.1, 2.6 \\
Closing down computers & 6.2 \\
Closing down ICS computer & 4.4, 9.4 \\
Closing down TCS computer & 4.3, 7.5 \\
Closing down the INT & 4.1, 6.0 \\
Collimation error & 11.1.3 \\
Commands - TCS user interface & 8.3 \\
Computer mode & 5.2 \\
Constants (for TCS software) & 7.7 \\
Control files & 2.4.1 \\
Control room & 2.6 \\
Control software & 2.4.1 \\
Coordinate systems & 3.3 \\
Coordinates & 2.1 \\
Corrector & 2.3 \\
Cryostat replenishment & 5.2 \\
CURRENT source & 8.1.3 \\
D-tapes & 6.3 \\
Data logging & 14.1 \\
Declination limit & 2.2 \\
Deleting files & 9.5.1 \\
Differential tracking & 8.4 \\
Disk - bad sectors & 9.5.2 \\
Disk space & 9.5.1 \\
DMA transfer problems & 9.5.2 \\
Dome encoder zeropoints & 11.7 \\
Dome plan & 2.2 \\
Dome temperature & 5.2 \\
Dome-closing procedure & 6.1 \\
Dome-opening procedure & 5.2 \\
Dust  & 5.2 \\
EDIT source & 8.1.3 \\
Editor (Perkin Elmer) & Appendix B.2 \\
EGLE disk & 9.3.1 \\
EHT (IPCS) standby & 6.2 \\
Encoders - testing & 11.1.6 \\
Engineering mode & 2.4.3 \\
Engineering rack & 2.6 \\
EXORSET & 2.6 \\
Fans & 5.2 \\
FAST SLEWING & 8.7 \\
Ferranti encoders & 2.2 \\
Ferranti encoders - see also encoders & \\
\end{tabular}

\begin{tabular}{ll}
Ferranti encoders initialisation & 11.1.5 \\
Finder-flop zeropoint & 11.3 \\
Finding charts & 3.3 \\
Flexure & 2.4.2 \\
Focal lengths & 2.3 \\
Focus and temperature compensation & 11.2 \\
Focusing the telescope & 4.9, 5.2 \\
Grinnell & 10.5 \\
Guide star acquisition & 4.10 \\
Guide stars with known probe coordinates & 12.3.7 \\
Guide stars with known RA and dec. & 12.3.6 \\
Guiding & 2.5.1, 3.0 \\
Handover of INT from duty techs. & 5.0 \\
Handset and guide buttons & 4.6.2 \\
Hardcopying TV images & 4.14 \\
HATERM & 11.1.5 \\
HELP on user interface & 8.2 \\
Hour-angle limit & 2.2 \\
Humidity limit & 5.2 \\
Ice on dome & 5.2 \\
ICONA meteorological-station readings & 5.1, 14.2 \\
ICS = Instrument Control Computer & \\
Index errors (encoders) & 11.1.5 \\
Index errors (index) - mail them to CRB & \\
Information display & 8.7 \\
INPSCF & 7.6.1, 7.7 \\
INPUT catalogue files & 5.2 \\
Instrument control computer = ICS & 2.6, 9.0 \\
Logbook (telescope) & 14.6 \\
Logbooks & 6.3 \\
Logging observations (automatic) & 14.1 \\
Magnetic-tape copy requests & 6.3 \\
Magnetic-tape handling & Appendix B.3 \\
Magnitude limits A\&G & 3.1, 3.2 \\
Mirror-cover closing & 6.1 \\
Mirror-cover opening & 5.2 \\
Mirror-plug removal & 5.2 \\
Mounting & 2.2 \\
NEXT source & 8.1.3 \\
Nightly report sheet & 6.3 \\
NOMINAL aperture & 4.11 \\
Notation conventions & 1.5 \\
Observations catalogues & 3.4 \\
Observing log & 6.3 \\
Offset accuracy & 2.2 \\
Offset stars & 3.3 \\
Offsets & 4.6.3 \\
Optics and optical performance & 2.3 \\
Own instruments & 15.0 \\
Parallactic angle & 8.7 \\
\end{tabular}

\begin{tabular}{ll}
Park positions & 5.0 \\
Passwords on ICS & 9.2 \\
PE 3120/3220 - see ICS or TCS & \\
Perkin-Elmer & 2.4 \\
Perkin-Elmer-speak & Appendix B \\
Photometric standards & 8.6.2 \\
Plan & 2.2 \\
Planning observations & 3.0 \\
Pointing accuracy & 2.2, 2.4.2 \\
Pointing grid & 8.6.2 \\
Pointing model & 2.4.1, 2.4.2, 11.1 \\
Pointing model and tests & 11.1.7 \\
Pointing model SNAFU & 4.7, 4.8 \\
Pointing problems & 13.2 \\
Pointing-grid catalogue & Appendix A \\
Primary mirror & 2.3 \\
Prime-focus A\&G geometry & 11.4.2, 12.2.1 \\
Printing copies of guide & 1.2 \\
Quality control for INT & 11.0 \\
Rain gauge readings & 5.1 \\
Rebooting TCS & 7.4 \\
Recent information & 1.2 \\
Reference point & 4.11 \\
Rotating Cassegrain turntable & 4.13 \\
Rotator centre & 11.4 \\
Runaway telescope & 13.3 \\
Safety lights & 5.2 \\
Secondary mirror & 2.3 \\
Seeing measurement & 14.4 \\
Servo constants & 11.8 \\
Setting time & 8.7 \\
Sky-area accessible & 2.2 \\
Slew speed & 2.2 \\
Slit viewing & 3.1 \\
SLOW SLEWING & 8.7 \\
SNAFU & 2.4.2, 4.7, 4.8, 5.2, 11.1.2, 11.1.5 \\
Spectrophotometric standards & 8.6.2 \\
Starting up ICS computer & 4.4, 9.3 \\
Starting up TCS computer & 4.3 \\
Starting up the INT & 4.1, 5.0 \\
STOPPED & 8.7 \\
Tasks running on TCS & 7.6 \\
TCS = Telescope Control Computer & \\
Telescope control & 2.4 \\
Telescope control computer & 7.0 \\
Telescope limits & 2.2 \\
Telescope logbook & 14.6 \\
\end{tabular}

\begin{tabular}{ll}
Temperature compensation of focus & 8.7 \\
Time service & 2.4.1 \\
TNHZ & 2.4.1 \\
TRACKING & 8.7 \\
Tracking accuracy & 2.2 \\
Trailing images & 8.4 \\
Troubleshooting & 13.0 \\
Tube & 2.2 \\
TV acquisition camera & 10.0 \\
TV camera tests & 11.6 \\
TV cameras & 2.5.1 \\
TV filters & 3.1 \\
TV focus & 11.6.1 \\
TV image archiving & 4.15 \\
TV image hardcopy & 4.14 \\
TV power up & 10.3, 10.6 \\
TV scale & 11.6.1 \\
User interface (TCS) & 2.4, 8.0 \\
User-supplied instruments & 15.0 \\
Usernames on ICS & 9.2 \\
Ventilation of dome & 5.2 \\
Vignetting & 2.2, 13.1 \\
Weather monitor & 2.6 \\
Wind-speed limit & 5.2 \\
Windspeed measurement and limit & 14.5 \\
Wynne corrector & 2.3 \\
Zenith limit & 2.2 \\
Zero-points of encoders & 2.2 \\
Zerodur & 2.3 \\
ZEROSET & 4.5, 8.4, 11.1.1, 11.1.5 \\
\end{tabular}
\end{document}
