\parindent 0pt
\parskip 0.3cm
%\section{Power Supply} \label{ch15:utility}
\section{POWER SUPPLY AND UTILITIES} \label{ch15:utility}

The INT has some major engineering systems where minor faults may be cured
by the Support Astronomer or Telescope Operator if they have the required
experience. Most faults, however, will require the intervention of the
the Duty Technician. On no account should a visiting observer tamper with any
of these systems:

\begin{itemize}
\item
{\bf The Buffer Set} \label{ch15:bufferset}
\item
{\bf Oil Pump and Hydrostatic Bearing System} \label{ch15:oilpump}
\item
{\bf Air-Conditioning to the PE\,3210 Instrument Computer}
\item
{\bf Air-Conditioning to the PE\,3220 Telescope Computer and CLIP Centre}
\item
{\bf Gaseous Nitrogen Distribution System}
%\item (Any Others ??)
\end{itemize}
