May 31 1997 14:04 Page �

findwindow.txt

   findwindow May97 ing

 NAME
 findwindow -- find CCD window parameters (for tweaking) from a LEXT
               catalog file

 USAGE
 findwindow catfile ccdname setfile

 PARAMETERS

   catfile
 Name of the LEXT catalogue file.

   ccdname
 Name of the CCD you are using (TEK2/LOR1/SIT1/etc.).

   setfile
 Name of the LEXT.SET file.

 DESCRIPTION
 This routine reads your LEXT catalog file, and transforms the (RA,DEC)
 coordinates of the fiducial stars into (X,Y) coordinates on the
 detector.

 From the (X,Y) pixel coordinates suitable window parameters are
 determined, which can be used in the tweaking process. Windowing will
 decrease the CCD read-out time, and consequently speed up the tweaking
 and the whole field acquisition process.

 After tweaking, don’t forget to reset the CCD window.

 EXAMPLES

         findwindow mycat.cat TEK2

 TIME REQUIREMENTS
 A lot less than doing it by hand.

 BUGS
 email John Telting, jht@ing.iac.es,
 for bug reports and constructive remarks

 SEE ALSO
 ldsstweak, roughtweak, finetweak

Printed by jht from vega.ing.iac.es