Table 1: TAURUS-2 filters (continued) Central Bandpass Diameter Thickness Thickness Comments wavelength (Å) (mm) of filter of cell (Å) (mm) (mm) 5700 450 63.5 6.0 5905 10 76.2 7.0 5960 490 63.5 6.1 7.0 6240 540 63.5 5.9 7.0 6303 15 63.5 10.0 6345 18 50.7 6.0 6565 15 76.2 13.0 6568 17 50.7 6.0 6577 15 76.2 13.0 6589 15 76.2 14.0 6589 16 50.8 5.1 6.0 6590 130 76.2 10.3 6601 15 76.2 13.0 6610 16 50.7 6.0 6613 15 76.2 13.0 6631 17 50.8 7.0 6639 18 76 6652 17 50.8 7.0 6667 15 76 6673 17 50.8 7.0 6676 15 76 6689 15 63.5 6.1 7.0 6692 18 76 6702 17 76 6714 18 76 6726 18 76 6730 50 50.8 6.1 7.0 6741 19 76 6754 19 76 6765 18 76 6770 50 50.8 6.1 7.0 6778 18 76 6792 18 76 6803 19 76 6816 18 76 6826 17 76 6838 17 76 6851 19 76 6859 16 76 6872 16 76 6884 18 76