Table 1: TAURUS-2 filters Central Bandpass Diameter Thickness Thickness Comments wavelength (Å) (mm) of filter of cell (Å) (mm) (mm) 3721 28 76 3737 50 50 8.5 3742 40 76 3760 34 76 3769 30 76 3770 15 50 9.0 4550 100 76.2 4.0 4550 300 63.5 6.1 7.0 4770 320 63.5 5.9 7.0 4868 15 63.5 6.1 4880 100 76.2 10.5 4883 15 63.5 7.0 4898 15 63.5 7.0 4912 15 63.5 6.1 4962 15 76.2 6.1 6.7 4974 15 76.2 6.0 7.0 5000 350 63.5 7.0 5009 15 76.2 13.0 5010 100 76.2 10.0 5012 20 50.7 9.1 10.0 5021 15 76.2 13.0 5032 20 50.8 9.2 10.1 5033 15 76.2 13.0 5046 15 76.2 12.2 (Missing) 5052 20 50.8 9.2 10.1 5065 15 76.2 7.0 5072 20 50.7 10.0 5092 20 50 10.6 (Missing) 5108 16 76 5124 16 76 5145 15 76.2 6.1 7.0 5164 16 76 5175 15 76.2 5.9 7.0 5194 16 76 5216 16 76 5220 380 63.5 6.0 7.0 5232 16 76 5247 17 76 5267 15 76 5340 15 76.2 5.1 7.0 5450 410 63.5 6.1 7.0 (Broken)