INT Operational logbook Page 1 of 2 Day: Date: DE: SA: TO:

Access to telescope and dome

Note in lefthand columns any restrictions on access to telescope or dome, or the presence of visitors in the dome.

When finished, sign-off in the righthand columns. Before starting this sheet, check previous sheet for sign-offs.

Access restriction Sign-off Local Description of restriction Initials Local Sign-off note Initials time time

System checks DE: Time: SA: Time:

Initial each of the sub-systems checked. Note any operational restrictions on the stop-press whiteboard in the control room. The DE and SA should both ensure the system is operational, then note time and initial above.

TEL DAS IDS/235 MUSICOS CAGB AUTO IDS/500 CIRSI DOME TV FOS Other (specify): CCDs (specify):

CCD cryostats CCDs List operational CCDs in lefthand column of table. Initial and note local time when filled.

Telescope focus and calibrate results Time: Prime Tel. focus: Tcomp: Cassegrain Tel. focus: Tcomp: TCS version: Calibrate used: new/default/last Temp. inside: Temp. out: Hum. in: Hum. out: Hour angle Error Declination Error Hour Error index index collimation New result Sky sigma (arcsec):

INT Operational logbook Page 2 of 2 Date:

Instrument/detector setup Time:

Note instrument name (e.g. IDS 500, IDS 235, FOS, WFC), configuration (collimator, filters, grating), and detector name (e.g. TEK3). Note instrument focus and detector capstan settings.

Instrument Configuration Detector Focus Capstan settings (A, B, C, D)

Free-format log Time Comment Initials

Night-time log: breakdown of observing time

During the night note for each stoppage the local time stopped and restarted and reason; for technical problems a fault report should be submitted, and only the fault report number should be noted here. At the start/end of the night note the local time dome opened/closed, the end/start of astronomical twilight, and the local time observing was started/stopped. Note number of dark hours observed, and the time lost to weather or faults.

Dome opened: Sunset: End astr. twilight: Observing started: Time Time Reason Fault Initials stopped started number

Observing stopped: Start astr. twilight: Sunrise: Dome closed: Dark hours available: Observed: Lost (weather): Lost (faults): Twilight hours available: Observed: Lost (weather): Lost (faults):