Day: Date: DE: SA: TO:

ACCESS TO TELESCOPE AND DOME

Note in lefthand columns any restrictions on access to telescope or dome, including the presence of visitors in the dome.

When finished, sign-off in the righthand columns. Before starting this sheet, check previous sheet for sign-offs. Sign-on Sign-off Local Description of restriction Initials Local Sign-off note Initials time (lock off if necessary) time

CRYOSTATS CCD Time filled / initials Time filled / initials Time filled / initials

SYSTEM CHECKS

The DE and SA should both ensure the system is operational, initial the relevant boxes below, and note the time. Operational restrictions should be noted on the stop-press whiteboard in the control room.

TEL ICL TAURUS PFIP DOME GHRIL LDSS AUX CAGB ISIS WHIRCAM AUTO UES INGRID TV WYFFOS AUTOFIB DE: Time: SA: Time:

A&G SETUP AND CALIBRATE RESULTS Focal station Configuration of acquisition system Tel. foc. Tcomp AG foc. TV foc. Cass Direct/slitviewing scale=5/12 TV switches: H=up/down V=up/down Optics in beam:

UES Derotator in/out TV switches: H=up/down V=up/down Optics in beam:

GHRIL Derotator in/out TV switches: H=up/down V=up/down Optics in beam:

Prime

Rot. centre redetermined? Y/N Focal station: Value (x,y): TCS version: Calibrate used: new/default/last Temp. inside: Temp. out: Hum. in: Hum. out: CALIBRATE Azimuth Error Elevation Error Horizontal Error RESULTS: index index collimation New result Sky sigma (arcsec):

NIGHT LOG Dome opened: Sunset: End astr. twilight: Observing started: Time Time Reason Fault Initials stopped started (if a technical problem, submit a fault report) number

Observing stopped: Start astr. twilight: Sunrise: Dome closed: Dark hours available: Lost to bad weather: Lost to faults: Twilight (after sunset, before sunrise) hours lost, and reason: