CONTROL ROOM - INFO SHEETS

ffl Info sheet on how to write data tapes using fitsout from lpss14/12 ffl INT DAS workaround number 1 — too few pixels ffl Sparc ICS Duty Tech note (somewhat out of date now) ffl Info sheet on how to switch from Sparc to PE IDS ICS control ffl Info sheet on how to run with the Sparc based DAS and IDS ICS ffl Info sheet on how to use iraf to look at the data ffl INT DAS user manual (Issue 2.1) ffl INT IDS ICS user manual (sparc based system) (Issue 0.2) ffl INT Cassegrain A&G user manual (sparc based system) (Issue 0.2) ffl User manual for the INT autoguider (v1.3 beta) ffl CCD characteristics for TEK3 (7/12/95) Do not remove this folder or inserts from the INT Control room.

Nicholas A Walton 19 June 1997 (INT Telescope Manager)